-1.0 -0.5 0.0 0.5 1.0

500

1000

1500

2000

2500

3000

3500

4000

Entries 40000 Mean x -0.08252 Mean y 63.46 RMS x 0.5206 RMS y 32.8

Pion Rejector_1 sum vs. x

-0.20 -0.15 -0.10 -0.05 -0.00 0.05 0.10 0.15 0.20

500

1000

1500

2000

2500

3000

3500

4000

Entries 40000 Mean x 0.02643 Mean y 63.57 RMS x 0.07593 RMS y 32.99

Pion Rejector_1 sum vs. y

-1.0 -0.5 0.0 0.5 1.0

500

1000

1500

2000

2500

3000

3500

4000

Entries 40000 Mean x -0.06366 Mean y 83.07 RMS x 0.5078 RMS y 66.95

Pion Rejector_2 sum vs. x

-0.20 -0.15 -0.10 -0.05 -0.00 0.05 0.10 0.15 0.20

500

1000

1500

2000

2500

3000

3500

4000

Entries 40000 Mean x -0.008692 Mean y 83.28 RMS x 0.08513 RMS y 68.66

Pion Rejector_2 sum vs. y