Entries 2650 Mean 585.1 RMS 226.3

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

3 10 Entries 2650

Right arm S1 L-PMT ADCs 0 Entries 11813 Mean 713.7 RMS 140

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

3 10 410 Entries 11813

Right arm S1 R-PMT ADCs 0

Entries 8133 Mean 842.1 RMS 229.4

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

310 Right arm S1 L-PMT ADCs 1 Entries 8461 Mean 904.9 RMS 253.5

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210 310 Entries 8461

Right arm S1 R-PMT ADCs 1

Entries 40000 Mean 408.1 RMS 181

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

310 410 Entries 40000

Right arm S1 L-PMT ADCs 2 Entries 14667 Mean 672.4 RMS 225.2

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

310

410 Entries 14667

Right arm S1 R-PMT ADCs 2

Entries 15004 Mean 633 RMS 122.9

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

3 10

410 Right arm S1 L-PMT ADCs 3 Entries 40000 Mean 592.7 RMS 227.8

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

3 10

410 Entries 40000

Right arm S1 R-PMT ADCs 3

Entries 16981 Mean 769.3 RMS 271.8

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

310 410 Entries 16981

Right arm S1 L-PMT ADCs 4 Entries 40000 Mean 477.5 RMS 164.2

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

3 10 410 Entries 40000

Right arm S1 R-PMT ADCs 4

Entries 6135 Mean 974.7 RMS 201.7

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210 310 Entries 6135

Right arm S1 L-PMT ADCs 5 Entries 40000 Mean 368.6 RMS 153.8

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

310

410 Entries 40000

Right arm S1 R-PMT ADCs 5