Entries 755 Mean 462.1 RMS 38

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 755

Right arm S2 L-PMT ADCs 0 Entries 1098

Mean 364.1 RMS 45.81

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 1098

Right arm S2 R-PMT ADCs 0

Entries 1263 Mean 482.8 RMS 39.38

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 1263

Right arm S2 L-PMT ADCs 1 Entries 1364

Mean 535.2 RMS 46.27

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 1364

Right arm S2 R-PMT ADCs 1

Entries 2240 Mean 365.4 RMS 34.17

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 2240

Right arm S2 L-PMT ADCs 2 Entries 7830

Mean 396.9 RMS 21.51

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 7830

Right arm S2 R-PMT ADCs 2

Entries 2497 Mean 439.9 RMS 35.85

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 2497

Right arm S2 L-PMT ADCs 3 Entries 3311

Mean 398.3 RMS 32.39

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 3311

Right arm S2 R-PMT ADCs 3

Entries 3724 Mean 521 RMS 28.15

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 3724

Right arm S2 L-PMT ADCs 4 Entries 3304

Mean 639.3 RMS 28.99

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 3304

Right arm S2 R-PMT ADCs 4

Entries 3530 Mean 511.2 RMS 26.76

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 3530

Right arm S2 L-PMT ADCs 5 Entries 4946

Mean 490.3 RMS 28.69

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 4946

Right arm S2 R-PMT ADCs 5

Entries 4162 Mean 514 RMS 27.83

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 4162

Right arm S2 L-PMT ADCs 6 Entries 7828

Mean 571.8 RMS 24.88

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 7828

Right arm S2 R-PMT ADCs 6

Entries 5130 Mean 563 RMS 27.58

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 5130

Right arm S2 L-PMT ADCs 7 Entries 6678

Mean 661.9 RMS 27.4

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 6678

Right arm S2 R-PMT ADCs 7