Entries 4329 Mean 594.3 RMS 27.24

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 4329

Right arm S2 L-PMT ADCs 8 Entries 4234

Mean 533.2 RMS 26.1

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 4234

Right arm S2 R-PMT ADCs 8

Entries 4820 Mean 376.2 RMS 27.84

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 4820

Right arm S2 L-PMT ADCs 9 Entries 4261

Mean 487.5 RMS 26.31

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 4261

Right arm S2 R-PMT ADCs 9

Entries 7134 Mean 399.2 RMS 36.62

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 7134

Right arm S2 L-PMT ADCs 10 Entries 7414

Mean 474.8 RMS 23.46

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 7414

Right arm S2 R-PMT ADCs 10

Entries 4101 Mean 577.5 RMS 29.23

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 4101

Right arm S2 L-PMT ADCs 11 Entries 3929

Mean 366.5 RMS 28.24

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 3929

Right arm S2 R-PMT ADCs 11

Entries 4782 Mean 581.7 RMS 28.23

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 4782

Right arm S2 L-PMT ADCs 12 Entries 13337

Mean 525.2 RMS 18.72

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 13337

Right arm S2 R-PMT ADCs 12

Entries 3448 Mean 500.5 RMS 36.97

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 3448

Right arm S2 L-PMT ADCs 13 Entries 3783

Mean 584.6 RMS 30.49

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 3783

Right arm S2 R-PMT ADCs 13

Entries 2574 Mean 593.9 RMS 32.52

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 2574

Right arm S2 L-PMT ADCs 14 Entries 3128

Mean 471.3 RMS 43.5

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 3128

Right arm S2 R-PMT ADCs 14

Entries 2119 Mean 626.3 RMS 35.47

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 2119

Right arm S2 L-PMT ADCs 15 Entries 2147

Mean 586.8 RMS 39.43

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-110

1

10

210

3 10

410 510 Entries 2147

Right arm S2 R-PMT ADCs 15