Entries 843 Mean 1596 RMS 375.7

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

Right arm S2 L-PMT TDCs 0 Entries 914

Mean 1597 RMS 409

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210 Entries 914

Right arm S2 R-PMT TDCs 0

Entries 1302 Mean 1548 RMS 441.9

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210 Right arm S2 L-PMT TDCs 1 Entries 1288

Mean 1544 RMS 438

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210 Entries 1288

Right arm S2 R-PMT TDCs 1

Entries 2167 Mean 1556 RMS 429.8

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

3 10 Entries 2167

Right arm S2 L-PMT TDCs 2 Entries 2133

Mean 1558 RMS 424.8

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

3 10 Entries 2133

Right arm S2 R-PMT TDCs 2

Entries 3029 Mean 1567 RMS 428.8

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

3 10 Entries 3029

Right arm S2 L-PMT TDCs 3 Entries 3142

Mean 1567 RMS 438.6

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

3 10 Entries 3142

Right arm S2 R-PMT TDCs 3

Entries 4077 Mean 1567 RMS 410.8

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

3 10 Entries 4077

Right arm S2 L-PMT TDCs 4 Entries 4055

Mean 1565 RMS 415.8

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

3 10 Entries 4055

Right arm S2 R-PMT TDCs 4

Entries 4453 Mean 1563 RMS 413.2

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

3 10 Entries 4453

Right arm S2 L-PMT TDCs 5 Entries 4487

Mean 1560 RMS 414.2

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

3 10 Entries 4487

Right arm S2 R-PMT TDCs 5

Entries 4822 Mean 1568 RMS 417

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

3 10 Right arm S2 L-PMT TDCs 6 Entries 4727

Mean 1570 RMS 415.8

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

3 10 Entries 4727

Right arm S2 R-PMT TDCs 6

Entries 5033 Mean 1567 RMS 425.1

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

3 10 Entries 5033

Right arm S2 L-PMT TDCs 7 Entries 5004

Mean 1569 RMS 422.7

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 1

10

210

3 10 Entries 5004

Right arm S2 R-PMT TDCs 7