Ar/CO2 75%/25% Ar/Ethane 62%/38%

1300

1350

1400

1450

1500

1550

1600

1650

1700

+ High Voltage 0

1

2

3 4

5

6

Amplifier Peak Output in Volts

Gas Gain of FPP Straw Tube