TJNAF Hall A Focal Plane Polarimeter Working Group

/net/fs1/home/rutt/text/experiments/tjnaf/fpp/FPP_comm_I_overview March 7, 1997 12:56 am

Overview of FPP Commissioning Period I

WHEN: 12:00 Mar ch 13 thr ough 06:00 Mar ch 17

SUMMARY: check alignment of chambers and measur e scattering fraction in carbon analyzer

REQUIRE: 100 Hz data rate & unif orm illumination of chambers

-2.4 GeV unpolarized beam -waterfall and carbon targets -electron and hadron spectrometer in present positions (HRSE at 16 and HRSH at 63 ) -mainly desire proton singles, may need to prescale coincidences

STAFFING: (per shift)

-two FPP hardware “experts” to monitor chambers and replay data

-one FPP software “expert” to coordinate replay -two “nonexperts” to do everything else

° °